10.000000

7.704338

5.935683

4.573051 3.5232332.714418 2.0912791.6111921.2413170.9563520.736806

line periods in mm

10.000000 7.704338 5.935683 4.573051 3.523233 2.714418 2.091279 1.611192 1.241317 0.956352 0.736806 0.567660 0.437345 0.336945 0.259594 0.200000